-76.5 -76 -75.5 -75 -74.5 -74 37

37.2

37.4

37.6

37.8

38

38.2

38.4

38.6

LIDAR 3:50:61 UTC

WAL

1004 mb,4:00:3 UTC

535.9 mb,4:17:2 UTC

350.7 mb,4:29:7 UTC

249.9 mb,4:38:7 UTC

140.9 mb,4:52:0 UTC

49.8 mb,5:14:3 UTC

latitude longitude

CAMEX1 9/29/93 co-locations: UW sonde(red), HIS spectra(blue), & GSFC LIDAR (green)

3:45:4 UTC

3:50:5 UTC

3:57:1 UTC