200 220 240 260 280 300

0

100

200

300

400

500

600

700

800

900

1000 va092904.rao: T vs. P

T (K)

P (mbar)

0 20 40 60 80 100

0

100

200

300

400

500

600

700

800

900

1000 va092904.rao: RH vs. P

RH