0 20 40 60 80 100

100

200

300

400

500

600

700

800

900

1000

P(mbar)

RH

UW-CLASS sonde and GSFC LIDAR RH profiles

~4UT UW-CLASS sonde 35290UT zenith GSFC LIDAR return long-time average GSFC LIDAR return