2000 2100 2200 2300 2400 2500 2600 2700 2800 150

200

250

300

350

wavenumber

BT averaged HIS spectrum. Band 3

2000 2100 2200 2300 2400 2500 2600 2700 2800 -30 -20 -10 0 10 20 30 40

wavenumber uncertainty in the mean