3.47 3.48 3.49 3.5 3.51 3.52 3.53 3.54 3.55 x 10^4 101 102 103 104 105 106 899-903 cm-1 RAD versus time

RAD time (UT)

101 101.5 102 102.5 103 103.5 104 104.5 105 0 1 2 3 4 5 6

RAD

# occurances

Histogram of 899-903 cm-1 RADs

mean = 103.62 +- 0.41